<script>
	function login() {
		const left = screen.width / 2 - 1020 / 2;
		const top = screen.height / 2 - 618 / 2;
		const newWindow = open(
			`https://github.com/login/oauth/authorize?client_id=${
				import.meta.env.VITE_GITHUB_APP_CLIENTID
			}`,
			'Authenticate',
			'resizable=1, scrollbars=1, fullscreen=0, height=618, width=1020,top=' +
				top +
				', left=' +
				left +
				', toolbar=0, menubar=0, status=0'
		);
		const timer = setInterval(() => {
			if (newWindow?.closed) {
				clearInterval(timer);
				location.reload()
			}
		}, 100);
	}
</script>

<div class="text-center text-white">
	<div class="text-2xl font-bold text-center pb-4">Choose your Git provider</div>
	<button on:click={login} class="hover:scale-110 transform duration-100 transition">
		<svg
			class="w-16"
			xmlns="http://www.w3.org/2000/svg"
			viewBox="0 0 24 24"
			fill="none"
			stroke="currentColor"
			stroke-width="2"
			stroke-linecap="round"
			stroke-linejoin="round"
			><path
				d="M9 19c-5 1.5-5-2.5-7-3m14 6v-3.87a3.37 3.37 0 0 0-.94-2.61c3.14-.35 6.44-1.54 6.44-7A5.44 5.44 0 0 0 20 4.77 5.07 5.07 0 0 0 19.91 1S18.73.65 16 2.48a13.38 13.38 0 0 0-7 0C6.27.65 5.09 1 5.09 1A5.07 5.07 0 0 0 5 4.77a5.44 5.44 0 0 0-1.5 3.78c0 5.42 3.3 6.61 6.44 7A3.37 3.37 0 0 0 9 18.13V22"
			/></svg
		>
	</button>
</div>
